INSERT INTO `dv_check_subject` (`record_id`, `plan_id`, `subject_id`, `subject_code`, `subject_name`, `subject_type`, `subject_content`, `subject_standard`, `remark`, `attr1`, `attr2`, `attr3`, `attr4`, `create_by`, `create_time`, `update_by`, `update_time`) VALUES (1, 207, 202, 'SUB039', '123', 'CHECK', '123', '123', '', NULL, NULL, 0, 0, '', '2024-12-26 16:03:48', '', NULL);
INSERT INTO `dv_check_subject` (`record_id`, `plan_id`, `subject_id`, `subject_code`, `subject_name`, `subject_type`, `subject_content`, `subject_standard`, `remark`, `attr1`, `attr2`, `attr3`, `attr4`, `create_by`, `create_time`, `update_by`, `update_time`) VALUES (2, 207, 203, 'SUB049', '点检项目2', 'CHECK', '液压是否正常', NULL, '', NULL, NULL, 0, 0, '', '2024-12-26 16:03:48', '', NULL);
INSERT INTO `dv_check_subject` (`record_id`, `plan_id`, `subject_id`, `subject_code`, `subject_name`, `subject_type`, `subject_content`, `subject_standard`, `remark`, `attr1`, `attr2`, `attr3`, `attr4`, `create_by`, `create_time`, `update_by`, `update_time`) VALUES (4, 208, 202, 'SUB039', '123', 'CHECK', '123', '123', '', NULL, NULL, 0, 0, '', '2025-08-07 11:55:04', '', NULL);
