create table fad_oa.FLW_EV_DATABASECHANGELOGLOCK
(
    ID          int          not null
        primary key,
    LOCKED      bit          not null,
    LOCKGRANTED datetime     null,
    LOCKEDBY    varchar(255) null
)
    charset = utf8mb4;

