-- 进度模板主表
CREATE TABLE `oa_schedule_template` (
                                        `template_id`      BIGINT       NOT NULL AUTO_INCREMENT COMMENT '模板主键',
                                        `template_name`    VARCHAR(64)  NOT NULL COMMENT '模板名称',
                                        `status`           INT          DEFAULT 1 COMMENT '状态(1启用 0停用)',
                                        `create_by`        VARCHAR(64)  DEFAULT NULL,
                                        `create_time`      DATETIME     DEFAULT CURRENT_TIMESTAMP,
                                        `update_by`        VARCHAR(64)  DEFAULT NULL,
                                        `update_time`      DATETIME     DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
                                        `del_flag`         CHAR(1)      DEFAULT '0' COMMENT '删除标识(0正常 1删除)',
                                        `remark`           VARCHAR(255) DEFAULT NULL,
                                        PRIMARY KEY (`template_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='进度模板主表';

-- 模板步骤明细
CREATE TABLE `oa_schedule_template_step` (
                                             `step_id`          BIGINT       NOT NULL AUTO_INCREMENT COMMENT '步骤主键',
                                             `template_id`      BIGINT       NOT NULL COMMENT '所属模板ID',
                                             `step_order`       INT          NOT NULL COMMENT '步骤顺序(从1开始)',
                                             `step_name`        VARCHAR(64)  NOT NULL COMMENT '步骤名称',
                                             `expected_days`    INT          DEFAULT NULL COMMENT '预期耗时(天)',
                                             `create_by`        VARCHAR(64)  DEFAULT NULL,
                                             `create_time`      DATETIME     DEFAULT CURRENT_TIMESTAMP,
                                             `update_by`        VARCHAR(64)  DEFAULT NULL,
                                             `update_time`      DATETIME     DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
                                             `del_flag`         CHAR(1)      DEFAULT '0',
                                             PRIMARY KEY (`step_id`),
                                             UNIQUE KEY `uniq_template_order` (`template_id`,`step_order`),
                                             CONSTRAINT `fk_tpl_step_template` FOREIGN KEY (`template_id`)
                                                 REFERENCES `oa_schedule_template` (`template_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='进度模板步骤表';

--------------------------------------------------------------------
-- 项目进度主表
CREATE TABLE `oa_project_schedule` (
                                       `schedule_id`      BIGINT       NOT NULL AUTO_INCREMENT COMMENT '项目进度主键',
                                       `project_id`       BIGINT       NOT NULL COMMENT '项目ID',
                                       `template_id`      BIGINT       NOT NULL COMMENT '引用的进度模板ID',
                                       `current_step`     INT          DEFAULT 0 COMMENT '当前进行到的步骤序号',
                                       `start_time`       DATETIME     DEFAULT CURRENT_TIMESTAMP COMMENT '进度开始时间',
                                       `end_time`         DATETIME     DEFAULT NULL COMMENT '进度完成时间',
                                       `status`           INT          DEFAULT 1 COMMENT '状态(1进行中 2已完成 0暂停)',
                                       `create_by`        VARCHAR(64)  DEFAULT NULL,
                                       `create_time`      DATETIME     DEFAULT CURRENT_TIMESTAMP,
                                       `update_by`        VARCHAR(64)  DEFAULT NULL,
                                       `update_time`      DATETIME     DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
                                       `del_flag`         CHAR(1)      DEFAULT '0',
                                       `remark`           VARCHAR(255) DEFAULT NULL,
                                       PRIMARY KEY (`schedule_id`),
                                       KEY `idx_project` (`project_id`),
                                       CONSTRAINT `fk_project_schedule_tpl` FOREIGN KEY (`template_id`)
                                           REFERENCES `oa_schedule_template` (`template_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='项目进度主表';

-- 项目进度步骤跟踪表
CREATE TABLE `oa_project_schedule_step` (
                                            `track_id`         BIGINT       NOT NULL AUTO_INCREMENT COMMENT '跟踪记录主键',
                                            `schedule_id`      BIGINT       NOT NULL COMMENT '所属项目进度ID',
                                            `step_order`       INT          NOT NULL COMMENT '步骤序号',
                                            `step_name`        VARCHAR(64)  NOT NULL COMMENT '步骤名称(冗余存储模板名称)',
                                            `plan_start`       DATETIME     DEFAULT NULL COMMENT '计划开始',
                                            `plan_end`         DATETIME     DEFAULT NULL COMMENT '计划完成',
                                            `actual_start`     DATETIME     DEFAULT NULL,
                                            `actual_end`       DATETIME     DEFAULT NULL,
                                            `status`           INT          DEFAULT 0 COMMENT '0未开始 1进行中 2完成 3暂停',
                                            `create_by`        VARCHAR(64)  DEFAULT NULL,
                                            `create_time`      DATETIME     DEFAULT CURRENT_TIMESTAMP,
                                            `update_by`        VARCHAR(64)  DEFAULT NULL,
                                            `update_time`      DATETIME     DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
                                            `del_flag`         CHAR(1)      DEFAULT '0',
                                            PRIMARY KEY (`track_id`),
                                            UNIQUE KEY `uniq_schedule_order` (`schedule_id`,`step_order`),
                                            CONSTRAINT `fk_project_step_main` FOREIGN KEY (`schedule_id`)
                                                REFERENCES `oa_project_schedule` (`schedule_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='项目进度步骤跟踪表';
``