-- 把默认工作台改成三列布局（w:4 占 1/3）
UPDATE `sys_config`
SET `config_value` = '[{"i":"announcements","x":0,"y":0,"w":4,"h":8,"widgetKey":"announcements"},{"i":"projectManagement","x":4,"y":0,"w":4,"h":8,"widgetKey":"projectManagement"},{"i":"ownerTaskList","x":8,"y":0,"w":4,"h":8,"widgetKey":"ownerTaskList"},{"i":"financialCharts","x":0,"y":8,"w":4,"h":8,"widgetKey":"financialCharts"},{"i":"feedbackList","x":4,"y":8,"w":4,"h":8,"widgetKey":"feedbackList"},{"i":"miniCalendar","x":8,"y":8,"w":4,"h":8,"widgetKey":"miniCalendar"},{"i":"quickEntry","x":0,"y":16,"w":12,"h":4,"widgetKey":"quickEntry"}]'
WHERE `config_key` = 'sys.dashboard.defaultLayout';
