-- JXPLTCM.PLTCM_PRO_SEG definition

CREATE TABLE "JXPLTCM"."PLTCM_PRO_SEG" 
   (	"ENCOILID" VARCHAR2(20) NOT NULL ENABLE, 
	"SEGNO" NUMBER DEFAULT 0 NOT NULL ENABLE, 
	"STARTPOS" FLOAT(126) DEFAULT 0, 
	"ENDPOS" FLOAT(126) DEFAULT 0, 
	"LENGTH" FLOAT(126) DEFAULT 0, 
	"PORSPEED" FLOAT(126) DEFAULT 0, 
	"PORSPEEDMAX" FLOAT(126) DEFAULT 0, 
	"PORSPEEDMIN" FLOAT(126) DEFAULT 0, 
	"PORSPEEDCNT" NUMBER DEFAULT 0, 
	"PORTENS" FLOAT(126) DEFAULT 0, 
	"PORTENSMAX" FLOAT(126) DEFAULT 0, 
	"PORTENSMIN" FLOAT(126) DEFAULT 0, 
	"PORTENSCNT" NUMBER DEFAULT 0, 
	"ENLTENS" FLOAT(126) DEFAULT 0, 
	"ENLTENSMAX" FLOAT(126) DEFAULT 0, 
	"ENLTENSMIN" FLOAT(126) DEFAULT 0, 
	"ENLTENSCNT" NUMBER DEFAULT 0, 
	"TLTENS" FLOAT(126) DEFAULT 0, 
	"TLTENSMAX" FLOAT(126) DEFAULT 0, 
	"TLTENSMIN" FLOAT(126) DEFAULT 0, 
	"TLTENSCNT" NUMBER DEFAULT 0, 
	"TLELONG" FLOAT(126) DEFAULT 0, 
	"TLELONGMAX" FLOAT(126) DEFAULT 0, 
	"TLELONGMIN" FLOAT(126) DEFAULT 0, 
	"TLELONGCNT" NUMBER DEFAULT 0, 
	"TLMESH1" FLOAT(126) DEFAULT 0, 
	"TLMESH1MAX" FLOAT(126) DEFAULT 0, 
	"TLMESH1MIN" FLOAT(126) DEFAULT 0, 
	"TLMESH1CNT" NUMBER DEFAULT 0, 
	"TLMESH2" FLOAT(126) DEFAULT 0, 
	"TLMESH2MAX" FLOAT(126) DEFAULT 0, 
	"TLMESH2MIN" FLOAT(126) DEFAULT 0, 
	"TLMESH2CNT" NUMBER DEFAULT 0, 
	"TLMESH3" FLOAT(126) DEFAULT 0, 
	"TLMESH3MAX" FLOAT(126) DEFAULT 0, 
	"TLMESH3MIN" FLOAT(126) DEFAULT 0, 
	"TLMESH3CNT" NUMBER DEFAULT 0, 
	"PLTENS" FLOAT(126) DEFAULT 0, 
	"PLTENSMAX" FLOAT(126) DEFAULT 0, 
	"PLTENSMIN" FLOAT(126) DEFAULT 0, 
	"PLTENSCNT" NUMBER DEFAULT 0, 
	"PLSPEED" FLOAT(126) DEFAULT 0, 
	"PLSPEEDMAX" FLOAT(126) DEFAULT 0, 
	"PLSPEEDMIN" FLOAT(126) DEFAULT 0, 
	"PLSPEEDCNT" NUMBER DEFAULT 0, 
	"TK1TEMP" FLOAT(126) DEFAULT 0, 
	"TK1TEMPMAX" FLOAT(126) DEFAULT 0, 
	"TK1TEMPMIN" FLOAT(126) DEFAULT 0, 
	"TK1TEMPCNT" NUMBER DEFAULT 0, 
	"TK2TEMP" FLOAT(126) DEFAULT 0, 
	"TK2TEMPMAX" FLOAT(126) DEFAULT 0, 
	"TK2TEMPMIN" FLOAT(126) DEFAULT 0, 
	"TK2TEMPCNT" NUMBER DEFAULT 0, 
	"TK3TEMP" FLOAT(126) DEFAULT 0, 
	"TK3TEMPMAX" FLOAT(126) DEFAULT 0, 
	"TK3TEMPMIN" FLOAT(126) DEFAULT 0, 
	"TK3TEMPCNT" NUMBER DEFAULT 0, 
	"TK4TEMP" FLOAT(126) DEFAULT 0, 
	"TK4TEMPMAX" FLOAT(126) DEFAULT 0, 
	"TK4TEMPMIN" FLOAT(126) DEFAULT 0, 
	"TK4TEMPCNT" NUMBER DEFAULT 0, 
	"RINSETEMP" FLOAT(126) DEFAULT 0, 
	"RINSETEMPMAX" FLOAT(126) DEFAULT 0, 
	"RINSETEMPMIN" FLOAT(126) DEFAULT 0, 
	"RINSETEMPCNT" NUMBER DEFAULT 0, 
	"CXLTENS" FLOAT(126) DEFAULT 0, 
	"CXLTENSMAX" FLOAT(126) DEFAULT 0, 
	"CXLTENSMIN" FLOAT(126) DEFAULT 0, 
	"CXLTENSCNT" NUMBER DEFAULT 0, 
	"TRIMTENS" FLOAT(126) DEFAULT 0, 
	"TRIMTENSMAX" FLOAT(126) DEFAULT 0, 
	"TRIMTENSMIN" FLOAT(126) DEFAULT 0, 
	"TRIMTENSCNT" NUMBER DEFAULT 0, 
	"TRIMSPEED" FLOAT(126) DEFAULT 0, 
	"TRIMSPEEDMAX" FLOAT(126) DEFAULT 0, 
	"TRIMSPEEDMIN" FLOAT(126) DEFAULT 0, 
	"TRIMSPEEDCNT" NUMBER DEFAULT 0, 
	"TRIMWIDTH" FLOAT(126) DEFAULT 0, 
	"TRIMWIDTHMAX" FLOAT(126) DEFAULT 0, 
	"TRIMWIDTHMIN" FLOAT(126) DEFAULT 0, 
	"TRIMWIDTHCNT" NUMBER DEFAULT 0, 
	"TRTENS" FLOAT(126) DEFAULT 0, 
	"TRTENSMAX" FLOAT(126) DEFAULT 0, 
	"TRTENSMIN" FLOAT(126) DEFAULT 0, 
	"TRTENSCNT" NUMBER DEFAULT 0, 
	"TELTENS" FLOAT(126) DEFAULT 0, 
	"TELTENSMAX" FLOAT(126) DEFAULT 0, 
	"TELTENSMIN" FLOAT(126) DEFAULT 0, 
	"TELTENSCNT" NUMBER DEFAULT 0, 
	"MILLENTRYSPEED" FLOAT(126) DEFAULT 0, 
	"MILLENTRYSPEEDMAX" FLOAT(126) DEFAULT 0, 
	"MILLENTRYSPEEDMIN" FLOAT(126) DEFAULT 0, 
	"MILLENTRYSPEEDCNT" NUMBER DEFAULT 0, 
	"MILLEXITSPEED" FLOAT(126) DEFAULT 0, 
	"MILLEXITSPEEDMAX" FLOAT(126) DEFAULT 0, 
	"MILLEXITSPEEDMIN" FLOAT(126) DEFAULT 0, 
	"MILLEXITSPEEDCNT" NUMBER DEFAULT 0, 
	"INSDATE" DATE DEFAULT SYSDATE, 
	"EXCOILID" VARCHAR2(20), 
	 CONSTRAINT "PLTCM_SEG_PK" PRIMARY KEY ("ENCOILID", "SEGNO")
  USING INDEX PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS 
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1 BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM"  ENABLE
   ) SEGMENT CREATION IMMEDIATE 
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255 NOCOMPRESS LOGGING
  STORAGE(INITIAL 16384 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1 BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "SYSTEM" ;

COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.PORSPEED IS 'POR开卷速度';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.PORTENS IS 'POR-BR1张力';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.ENLTENS IS 'BR1-LOOPER张力';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.TLTENS IS '拉矫机张力';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.TLELONG IS '拉矫机延伸率';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.TLMESH1 IS '拉矫机1#辊插入量';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.TLMESH2 IS '拉矫机2#辊插入量';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.TLMESH3 IS '拉矫机3#辊插入量';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.PLTENS IS '酸洗段张力';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.PLSPEED IS '酸洗段速度';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.TK1TEMP IS '1#酸槽温度';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.TK2TEMP IS '2#酸槽温度';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.TK3TEMP IS '3#酸槽温度';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.TK4TEMP IS '3#酸槽温度';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.CXLTENS IS '酸洗出口活套段张力';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.TRIMTENS IS '圆盘剪张力';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.TRTENS IS '酸洗卷取带钢张力';
COMMENT ON COLUMN JXPLTCM.PLTCM_PRO_SEG.TELTENS IS '联机活套带钢张力';