<template>
  <BasePage :qrcode="qrcode" :querys="querys" :labelType="labelType" :hideType="hideType" />
</template>

<script>
import BasePage from './panels/base.vue';

export default {
  components: {
    BasePage
  },
  data() {
    return {
      qrcode: true,
      querys: {
        dataType: 1,
        // itemType: 'raw_material'
        materialType: '原料'
      },
      labelType: '2',
      hideType: true
    }
  }
}
</script>